This page was too severely malformed for calibre to handle. It has been replaced by this error message.

Traceback (most recent call last):
File "c:\program files\calibre\library.zip\calibre\ebooks\html.py", line 505, in parse_html
File "lxml\html\__init__.pyo", line 114, in body
IndexError: list index out of range